4000 4500 5000 5500 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 x 10^{-17}

Hδ Hγ Ca II H&K Hβ GRB 100625A z = 0.452

age = 640 Myr

+o

Rest Wavelength (Angstroms)

Fλ (erg cm -2 s-1 Ang -1)