RightAscension (J2000)

Declination (

J2000

)

12:25:21.0 20.0 19.0 18.0

+20:06:30

20

10

00

05:50

-4.0 -2.0 0.0 +2.0 +4.0

Flux Density (mJy beam^{-1})