5500 6000 6500 7000 7500 8000 8500 9000 0

0.5

1

1.5

2

2.5 GRB 070809

z = 0.473

Wavelength (Ang)

Flux (10 -17 erg/cm 2/s/Ang)

CaII H&K

[OII]

G band

Na I

5400 5500 5600 0.4 0.6 0.8 1 [OII]