6000 6500 7000 7500 8000 -1

-0.5

0

0.5

1

1.5

2

2.5 x 10^{-18}

Wavelength (A)

Flux (erg cm -2 s-1)

[O II]

GRB 070714B

Keck I / LRIS 2007 August 13.54 UT